From 33143554f3675821ce4799422ea43be29d8d887b Mon Sep 17 00:00:00 2001
From: listout <listout@protonmail.com>
Date: Wed, 18 Aug 2021 16:11:03 +0530
Subject: addes usage of UART in avr project

---
 resume.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'resume.tex')

diff --git a/resume.tex b/resume.tex
index f41668b..50624d0 100644
--- a/resume.tex
+++ b/resume.tex
@@ -117,9 +117,9 @@
 	\subsection{Interfacing with sonar module using Atmega328p:}
 	Using \textit{AVR C} and \textbf{Atmega328p} to interface with
 	\textbf{HC-SR04} (sonar module). Every functionality is written from scratch
-	and 8-bit fast PWM configuration is used. The interfacing was done in the
-	\textit{form of a library} to make code \textit{reusable}, PlatformIO was
-	used as the generation toolset.
+	and 8-bit fast PWM configuration is used and \textbf{UART} for
+	communication. The interfacing was done in the \textit{form of a library} to
+	make code \textit{reusable}, PlatformIO was used as the generation toolset.
 	\href{https://gitlab.com/listout/avr_programming/-/tree/sonar_module} {Link
 	to project}.
 
-- 
cgit v1.2.3

